Ω/ω φ=arg(X)

0 1 2 3 4

-1

0

1 δ=0.05 δ=0.1 δ=0.2 δ=0.4

Phase angle of the forced motion ofa harmonic oscillator: x’’+ 2 δ x’+ ω^2 x = F cos(Ωt) where x’(t)=dx/dt etc.